Copyright: Copyright (c) 1996-2000, MidiTec
Citation: EarMaster - Copyright (c) 1996-2000, MidiTec


 Hangközök,   [image] [image] akkordok

és   [image]  skálák felismerése

A hangköz, akkord, és skála gyakorlatok azonos módon mûködnek.

Az EarMaster a beállított választékból lejátszik egy véletlenszerûen kiválasztott akkordot, tetszõleges hangról. Az Ön feladata, hogy felismerje, mit hallott?!

Alapvetõen kétféleképpen válaszolhat: vagy közvetlenül megadja a hallott akkord nevét, vagy külön-külön megadja az akkord hangjait. Bármelyik megoldást választja, a válaszadáshoz különbözõ eszközök állnak rendelkezésére.

Nyomja meg:

A ‘Feladat újrahallgatása’ gombot, ha még egyszer meg szeretné hallgatni a feladatot, mielõtt válaszolna.

’Az Ön válasza’ gombot, ha szeretné meghallgatni az Ön által megadott hangzatot.

A ’Megoldás’ gombot, ha már megoldotta a feladatot, és szeretné, hogy az EarMaster ellenõrizze a megoldás helyességét.

Ha a válasz nem helyes, az EarMaster piros színnel fogja jelölni, de a jó választ is megmutatja zöld színnel.

Aktuális eredményeirõl mindig részletes információt kaphat, és összehasonlíthatja azt korábbi eredményeivel az [image] "Eredmények" ablakban.

Az akkord felismerés beállításai

Hangközelmélet

Akkordelmélet

Skálaelmélet


 Hangközviszonyítás

Melyik hangköz a nagyobb?

Az EarMaster két hangközt játszik le véletlenszerûen a beállításban szereplõ hangközök közül.

Kattintson az ’A’ gombra, ha az elsõ hangköz volt nagyobb, illetve a ’B’-re, ha a második. A választott gomb színe megváltozik: zöld lesz, ha a válasz helyes, és piros, ha rosszul válaszolt.

Nyomja meg a ‘Feladat újrahallgatása’ gombot, ha még egyszer meg szeretné hallgatni a feladatot, mielõtt válaszolna.

Aktuális eredményeirõl mindig részletes információt kaphat, és összehasonlíthatja azt korábbi eredményeivel az [image] "Eredmények" ablakban.

A Hangközviszonyítás beállításai

Hangközelmélet


 Dallamdiktálás

Milyen hangokat (dallamot) hallott?

Az EarMaster játszik egy – a beállításoknak megfelelõ - dallamot (frázist). Az Ön feladata a hangok felismerése és lejegyzése a kottasor, a zongorabillentyûzet vagy a gitár fogólap segítségével.

Nyomja meg:

A ‘Feladat újrahallgatása’ gombot, ha még egyszer meg szeretné hallgatni a dallamot, mielõtt válaszolna.

’Az Ön válasza’ gombot, ha szeretné meghallgatni az Ön által megadott dallamot.

A ’Megoldás’ gombot, ha már lejegyezte a hangokat, és szeretné, hogy az EarMaster ellenõrizze a megoldás helyességét.

Aktuális eredményeirõl mindig részletes információt kaphat, és összehasonlíthatja azt korábbi eredményeivel az [image] "Eredmények" ablakban.

A Dallamdiktálás beállításai


Ritmus olvasás és
 Ritmus olvasás és   [image] Ritmus visszaadás

Ritmus olvasás: Az EarMaster mutat egy ritmuskottát. Tapsolja el (játssza vissza) azt a metronóm segítségével!

Ritmus visszaadás: Az EarMaster lejátszik egy ritmust. Ismételje el a metronóm segítségével! Az elsõ kísérlet után választhat, hogy megnézi-e a ritmus kottáját, mielõtt másodszor próbálkozna.

A ritmus visszaadást lekopoghatja a számítógép billentyûzet hosszú “Szóköz” billentyûjén, vagy lejátszhatja azt egy MIDI-s hangszeren, illetve eltapsolhatja (eldobolhatja) mikrofonba. A mikrofonos felvétel aktiválható a “Válaszadás módja” menüpontban.

A ritmuskottában a következõ jeleket láthatja a hangok alatt:

 Ha a hangot pontosan szólaltatta meg.

 Ha a hang kissé korábban szólalt meg, mint kellett volna.

 Ha a hang kissé késõbb szólalt meg, mint kellett volna.

 Ha a hangot egyáltalán nem szólaltatta meg.

Figyelem: Az EarMaster akkor is értékeli a ritmusjáték precizitását, ha még nem volt 100 %-os, bár minden hang megszólalt.

Aktuális eredményeirõl mindig részletes információt kaphat, és összehasonlíthatja azt korábbi eredményeivel az [image] "Eredmények" ablakban.

A ritmus nehézségi szintjét és hosszát a gyakorlat beállítások ablakban adhatja meg.

A Ritmus visszaadás beállításai


 Ritmus javítás

Találja meg a különbséget a lekottázott és a hallott ritmus között!

Az EarMaster mutat egy ritmuskottát. Ha lenyomja a ’Változtatott ritmus’ gombot, az EarMaster eljátssza a lekottázott ritmust, de valamilyen eltéréssel. A változtatásnak csak három formája lehetséges:

· egy hang ketté lett osztva.

· két hang össze lett vonva.

· két hangot felcseréltünk.

Jelölje meg az összes hangot, mely megváltozott! A hang kiválasztása egérkattintással történik. Ha még egyszer kattint ugyanarra a hangra, a kijelölés megszûnik.

Ha minden megváltozott hangot megjelölt, kattintson a ’Mutatom a változást’ gombra! Ekkor a program megmutatja a hallott ritmust és a magváltoztatott ritmust egyaránt.

Aktuális eredményeirõl mindig részletes információt kaphat, és összehasonlíthatja azt korábbi eredményeivel az [image] "Eredmények" ablakban.

A ritmus nehézségi szintjét és hosszát a gyakorlat beállítások ablakban adhatja meg.

A Ritmus javítás beállításai


 Akkordfûzés

Az EarMaster lejátszik egy harmónialáncot. Az Ön feladata felismerni a hallott harmóniák funkcióit (melyik skálafokra épülnek) és jellegét. Alapvetõen kétféle módon válaszolhat: közvetlenül az akkordfûzésnek megfelelõ nyomógomb megnyomásával, vagy megadhatja a hallott akkordokat egyenként is. A ’Válasz módja’ menüpontban aktiválhatja vagy elrejtheti a feladatmegoldás különbözõ lehetõségeit:

Kottasor – ebben a gyakorlatban nem használhatja a kottasort a válaszadáshoz, mert az itt csak a válasz megmutatásához áll rendelkezésre. Kattintson valamelyik ütembe, hogy meghallgathassa a benne lévõ harmóniát, és a narancssárga kurzor átkerüljön oda. A kottasor alatt talál egy panelt (amennyiben nem csak a ’Név szerint’ opció van aktiválva a ’Válasz módja’ menüpontban), ott megjelölheti az akkord jellegét. Ha rákattint a kottasorban egy harmóniára, a narancsszínû kurzor odamozdul, és Ön megváltoztathatja az akkord jellegét miközben az meg is szólal.

Név szerint – Kattintson arra a gombra, amelyen az Ön által hallani vélt harmóniasor jelét látja. Ha bal egérgombbal kattint, kiválasztja és meghallgathatja az adott harmóniasort anélkül, hogy válaszadásnak értelmezné az EarMaster. A jobb egérgombos kattintás kiválasztást és válaszadást jelent.

Zongorán – az adott hangnem harmóniai funkcióit jelzi a program a zongorabillentyûkön. Bal egérgombbal kattintva valamelyiken az akkord behelyezõdik a kottába arra a pontra, ahol a narancsszínû kurzor áll, a jobb egérgombbal kattintva pedig eltávolíthatjuk a beírt akkordot. A megszólaltató hangszer hangját és hangerejét megváltoztathatja a zöld kijelzõn.

Gitáron - az adott hangnem harmóniai funkcióit jelzi a program a gitár fogólapon. Bal egérgombbal kattintva valamelyik érintõn az akkord behelyezõdik a kottába arra a pontra, ahol a narancsszínû kurzor áll, a jobb egérgombbal kattintva pedig eltávolíthatjuk a beírt akkordot.

Nyomja meg:

A ‘Feladat újrahallgatása’ gombot, ha még egyszer meg szeretné hallgatni az akkordsort, mielõtt válaszolna.

’Az Ön válasza’ gombot, ha szeretné meghallgatni az Ön által megadott akkordsort.

A ’Megoldás’ gombot, ha már lejegyezte az akkordokat, és szeretné, hogy az EarMaster ellenõrizze a megoldás helyességét.

Ha az Ön megoldása rossz, az EarMaster piros színnel fogja jelezni, ha jó – zöld színnel.

Aktuális eredményeirõl mindig részletes információt kaphat, és összehasonlíthatja azt korábbi eredményeivel az [image] "Eredmények" ablakban.

Az Akkordfûzés beállításai


 Az akkordok, hangközök és skálák beállításai

A hang beállító panel – Kattintson azokra az elemekre (akkordok, hangközök, stb.) amelyeket szeretne a gyakorlathoz hozzáadni, illetve abból eltávolítani.

Az elsõ elemek (piros színnel írva) elõre beállítottak, ezért ezeket nem lehet átszerkeszteni. Az ezek alatt lévõ helyeken viszont hozzáadhatja saját akkordjait, hangközeit stb.

Ha a szöveg zöld színû, a név és a hangok szerkeszthetõk.

Az alaphang mozgása – Állítsa be az alsó és felsõ határhangot, melyek között az alaphang mozoghat, és válassza ki, ezen belül milyen logika alapján mozogjon!

Játékstílus – válassza ki, a program hogyan szólaltassa meg a hangokat: egyszerre, felfele vagy lefelé bontva. Ha többféle lehetõséget is megjelöl, akkor a program véletlenszerûen váltogatja azokat.

További beállítások:

Automatikus válasz

Közös hang - (csak a Hangközviszonyításban)

Mutatja az elsõ hangot

Mutassa az elõjegyzést

Egérkattintásra hang

Hangozzék a tonalitás

Diatonikus alaphangok (csak a Hangköz felismerésben)

Fordítások  (csak az Akkordfûzésben)

Az alaphang megerõsítése

Válaszmód rögzítése  (csak az EarMaster School-ban)

Kapcsolódó gyakorlatok:

Hangközviszonyítás

Hangköz felismerés

Akkord felismerés

Akkord fordítások

Akkordfûzés

Skála felismerés


Automatikus válasz – Az EarMaster automatikusan aktiválja a ’Megoldás’ gombot, ha a válasza helyes.


Közös hang- a két hangközt azonos alaphanggal szólaltatja meg


Mutatja az elsõ hangot – Az EarMaster megmutatja a jó megoldás szerinti elsõ hangot (vagy a harmónia legalsó hangját)


Mutassa az elõjegyzést – ezt választva a kottasor az elõjegyzést mutatja, így nem kell a módosítójeleket a hangok elé külön kitenni


Egérkattintásra hang – megszólal a hang, amikor a zongorabillentyûn, a gitár fogólapon vagy a kottán kattintunk az egérrel


Hangozzék a tonalitás – a feladat elõtt a program megszólaltat néhány hangot, hogy a hangnemet érzékeltesse.


Diatonikus alaphangok- a hangközöket a hangnemen belül mindig úgy adja, hogy csak diatonikus hangokat tartalmazzanak


Fordítások – válassza ki, az akkordok milyen fordításban jelenjenek meg:

1) Minden hangzat alaphelyzetben

2) A záró hangzat alaphelyzetû. A megelõzõ hangzatok olyan fordításban szólalnak meg, hogy felsõ hangjaik az utolsó hangzat felsõ hangjához igazodnak.

3) A záró hangzat fordítása véletlenszerû. A megelõzõ hangzatok olyan fordításban szólalnak meg, hogy felsõ hangjaik az utolsó hangzat felsõ hangjához igazodnak.


Az alaphang megerõsítése – hozzáadja az akkord alaphangját az alsó szólamban (ha nem jelöljük be, az alaphang nem szól!)


Válasz mód rögzítés - itt állítható be, hogyan válaszoljon a tanuló (t.i. amikor automatikus Feladatsorral - “Tanársegéd”del – dolgozik.


Ritmusok – A dallamfordulat ritmusértékeket is tartalmazzon. A válaszadásnál le kell jegyezni a hangmagasságot és a ritmust egyaránt. Csak egész, fél és negyed értékeket ad.


Az elem neve.

Ha az elem nevének valamelyik betûje elé ‘&’ jelet tesz, az adott betû ennek az elemnek a gyorsbillentyû parancsává válik. Így a válaszadáshoz csak az <Alt> + betû kombinációt kell beütnie a számítógép billentyûzetén.


Az elemben lévõ hangok struktúrája, ahogy az a gyakorlatban megszólal.

Kattintson a zongorabillentyûkön valamelyik hangra, hogy azt hozzáadja, illetve elvegye.

A hangokat MIDI-billentyûzetrõl is beviheti. A kis zöld háromszög (kulcslyuk) az egyvonalas C hangot jelöli.


 A Dallamdiktálás beállításai

Az EarMaster egy intelligens algoritmus segítségével generálja a dallamokat, mely igazodik az alábbi beállításokhoz:

Hangok – adja meg a dallam hosszát (hány hangból álljon).

Skála/harmóniasor – válasszon egy skálát, hangnemet vagy akkordsort, melynek alapján a program a dallamot generálni fogja

Legnagyobb hangköz – jelölje meg a legnagyobb hangközt, mely a dallam két szomszédos hangja között elõfordulhat

Hangterjedelem – válassza ki a legnagyobb hangközt, mely a dallam legalsó és legfelsõ hangja közt lehet.

Hanghatárok – jelölje azt a hangterületet, amin belül a dallam mozoghat.

Hangnem beállítás

Kattintással jelölje ki azokat a hangnemeket, melyekben a dallam megszólalhat.

További beállítások:

Ritmusok

Automatikus válasz

Mutatja az elsõ hangot

Mutassa az elõjegyzést

Egérkattintásra hang

Hangozzék a tonalitás

Válasz mód rögzítéset  (csak az EarMaster School-ban)

Dallamdiktálás


 A ritmus beállításai

Az EarMaster egy intelligens algoritmus segítségével generálja a ritmusokat, mely igazodik az alábbi beállításokhoz:

Kattintson a kiválasztáshoz:

•	Milyen ritmusértékek és triolák legyenek a gyakorlatban

•	Szünetek és pontozott ritmusok. (a ritmusértékek a fent beállítottaknak megfelelõk lesznek)

•	Átkötött hangok

Válasszon:

•	Ütemjelzõ(ke)t a ritmushoz.

•	Hány ütemes legyen a gyakorlat.

•	A gyakorlathoz tempót (metronóm számot)

Változtatások száma (csak a Ritmus javításnál)

Mutassa a ritmust másodszorra (csak a Ritmus visszaadásnál)

Értékelés

Válasszon, mennyire kelljen pontosan visszaadni a ritmust. A ’Jószívû’ beállításnál nem kell túlzottan pontosnak lenni, míg a ’Szigorú’ beállításnál nagyon precíz ritmusérzékkel kell a gyakorlatot megoldani.

Ritmus visszaadás

Ritmus olvasás

Ritmus javítás


Változtatások száma – adja meg, hány változtatást tehet a program a ritmusgyakorlatba!


Mutassa a ritmust másodszorra – automatikusan mutatja a gyakorlat ritmusának kottáját, amikor az elsõ visszajátszás megtörtént. Ez vizuális segítség a második próbálkozáshoz.


A hangmagasságon alapuló gyakorlatoknál (hangköz, akkord, dallam, stb.) különbözõ módokon adhatja meg a választ. Ezeket a ’Válasz módja’ menüpontban találhatja meg, ahol lehetõsége van az egyes módok aktiválására, illetve elrejtésére is:

Kottán – egy hang bejegyzéséhez nyomja meg és tartsa lenyomva a bal egérgombot. A hangmagasság változtatásához mozgassa az egeret le/fel, kereszt (#) vagy bé-jel (b) beviteléhez jobbra illetve balra. A jobb egérgombbal többször kattintva ciklikusan elõhozhatjuk a különbözõ ritmusértékeket és a radírt.

Név szerint – Kattintson arra a gombra, amelyen az Ön által hallani vélt hangok (hangköz, akkord, stb.) jelét látja. Ha bal egérgombbal kattint, kiválasztja és meghallgathatja az adott harmóniasort anélkül, hogy válaszadásnak értelmezné az EarMaster. A jobb egérgombos kattintás kiválasztást és válaszadást jelent.

Zongorán –Bal egérgombbal kattintva kiválaszthatjuk a hangot, jobb egérgombbal pedig megszüntethetjük a kiválasztást. A megszólaltató hangszer hangját és hangerejét megváltoztathatja a zöld kijelzõn.

Gitáron - Bal egérgombbal kattintva kiválaszthatjuk a hangot, jobb egérgombbal pedig megszüntethetjük a kiválasztást.


Használja a mikrofont a hangok énekléséhez, illetve a ritmus tapsolásához (dobolásához). A ’Válasz módja’ menüpontban aktiválhatja vagy leállíthatja a mikrofonnal történõ felvételt.


A hangok és ritmusok kiválasztását, bevitelét külsõ MIDI-s hangszerrel is megteheti. Arra is van lehetõség, hogy a MIDI billentyûzet egyes hangjaihoz különbözõ funkciókat rendeljünk (például a C2 billentyû lenyomása megegyezik az ’Új feladat’ gomb lenyomásával a programfelületen. Így az EarMaster-t “távvezérelhetjük”).


Itt adhatja meg a nevet, amely majd az eredmények nyomtatásánál jelenik meg a lap tetején. Az EarMaster School-ban megváltoztathatja a felhasználói nevét, jelszavát és saját mappáját.


Az eredmények törlése

Ezzel a funkcióval törölheti a különbözõ gyakorlatok korábbi eredményeit. A törölt eredményeket késõbb nem lehet visszahozni, ezért törlés elõtt célszerû mentést végezni az addigi eredményekrõl. Használja az import/export funkciót a ’Fájl’ menüben az eredmények floppyra vagy merevlemezre történõ mentéséhez.


 A Beállítások menü

A ’Beállítások’ menüpontban rendelkezésre álló almenük attól függenek, hogy melyik gyakorlatot aktiváltuk.

MIDI hangnémítás – a választott MIDI eszköznek  ’Minden hang némítva’ üzenetet küld.

MIDI kontrollerek “reset” - a választott MIDI eszköznek  ’Minden kontroller kikapcsolva’ üzenetet küld. Ez az üzenet minden kontrollert (pl. nyújtó pedál, modulációs kerék, effektek, stb.) alaphelyzetre állít vissza.

MIDI távvezérlés – Aktiválja a MIDI “távvezérlést” a gyakorlatok számára. A programfelület minden nyomógombját különbözõ MIDI-billentyûhöz lehet rendelni, melyet a ’Program beállítások’ ablakban állíthatunk be.

Új feladat automatikusan – ha ezt kiválasztja, minden válasz után automatikusan új feladatot ad a program. A ’Program beállítások’ ablakban beállítható ehhez a várakozási idõ és néhány egyéb paraméter,

A metronóm látszik – Aktiválja a metronómot képileg (de ettõl még nem hangzik, csak látszik)

A metronóm kopog – hallható a metronómütés, miközben a ritmust játssza a program. Ez az opció nem befolyásolja a bevezetõ ütem metronóm hangját, illetve a válaszadás közbeni metronóm hangot.

Válasz azonosítás – Meghatározza, hogy az EarMaster hogyan értelmezze a választ. Abszolút: A hangokat pontosan oda kell kottázni a válasz során, ahol elhangzottak. Bármely oktávban: csak az a lényeges, hogy ugyanazt a hangot jelezze, az oktávfekvés nem számít. Relatív: a válaszban a hangokat szabadon transzponálhatja (pl. ha a feladatban tiszta kvartot kellett felismerni, ami C-F-en hangzott, akkor a D-G-vel adott választ is helyesnek fogadja el a program.

Mutatja a hangnemet  - ha ezt bejelöli, az Earmaster ki fogja írni a kottasorban a hangnem nevét. Ez az opció csak akkor érhetõ el, ha a gyakorlat beállítások ablakban aktiválta a ’Mutassa az elõjegyzést’ funkciót.


Válassza ki, melyik MIDI-csatornán (1-16) történjék a kommunikáció ebben a hangprofilban! A 10-es csatorna a ritmus-csatorna.


Válassza ki, milyen hangszer hangjával szeretne gyakorolni ebben a feladatban. Ha a 10-es csatorna a ritmus profil számára van kijelölve, akkor ez az opció nem elérhetõ. A ’Program change’ (hangszerváltás) üzenetet mindannyiszor elküldi a program, ahányszor másik gyakorlatot választ. Ezt a beállítást a MIDI-hangszerrel is el lehet végezni: állítsa a kurzort ebbe a mezõbe, és válasszon hangot a MIDI-hangszerén.


Válasszon egy ’kezdés’ (az adott hangszer relatív hangereje) értéket ehhez a hanghoz! Az összhangerõ állításához menjen az ’Eszközök’ fülre!


Válassza ki, a program milyen dallam- illetve ritmushangszer hangján adja a feladatokat!

Ezt a beállítást a MIDI-hangszerrel is el lehet végezni: állítsa a kurzort ebbe a mezõbe, és válasszon hangot a MIDI-hangszerén.


Ha ezt bejelöli, az EarMaster minden gitár hangot egy oktávval feljebb transzponál a zavaros, összefolyó hangzás elkerülése érdekében.


Válassza ki, milyen MIDI-bemeneti eszközt kíván használni!


Válassza ki, milyen MIDI-kimeneti eszközt kíván használni!

Figyelem: néhány hullámtáblás hangkártya használatánál valamelyest késik a hang. Ilyen esetben ezt a késést szinkronizálni kell a ritmus feladatok pontossága érdekében.


Válassza ki a MIDI-hangerõt ehhez az eszközhöz!


A hang késése 1/1000 másodpercben.


Válassza ki, milyen nyelvet szeretne használni! A legördülõ menüben megtalálhatja az összes olyan nyelvet, amelynek “*.LAN” fájlja megtalálható a \Language alkönyvtárban.


Válassza ki annak a betûtípusnak a nevét, stílusát és méretét, melyet az EarMaster-ben használni szeretne!


Válasszon háttérszínt a gyakorlat ablakokhoz!


Válassza ki, a ritmuskotta milyen írásmódban jelenjen meg! Az ’Egyforma távolsággal’ beállítás esetén minden ritmusérték egyenlõ távolságra lesz a másiktól. Ez a helytakarékosabb beállítás, a monitor kis felbontása esetén ez ajánlott. Az ’Idõarányosan’ beállításnál az ütemek egyforma hosszúságúak, és minden ritmus az értékével arányos helyet foglal el benne.


Ha ezt bejelöli, az EarMaster automatikusan új feladatot ad minden válasza után.


Beállíthatja azt a várakozási idõt másodpercben, amely az Ön válasza, és az automatikusan érkezõ új feladat között eltelik.


Ha ezt bejelöli, az EarMaster nem fog automatikusan új feladatot adni abban az esetben, ha az Ön válasza rossz volt. Ezzel idõt kap arra, hogy megtalálja, mit rontott el.


A Ritmusolvasás és a Ritmus visszaadás gyakorlatoknál beállíthatja, hogy az EarMaster a megadott eredmény szint alatt ismételje meg a feladatot. Ezt a beállítást használja az EarMaster a ritmusgyakorlatok eredményességének vizuális és hangi értékeléséhez is (pl. ha az eredmény ez alatt a szint alatt volt, a program lejátssza a “Wrong” hangfájlt).


Nyomja meg ezt a gombot, ha a programindításoknál látható ’Tipp’-eket újra elölrõl szeretné látni.


Állítsa be a mikrofon érzékenységét a hangmagasság jellegû gyakorlatokhoz. Ez a beállítás nem azonos a Windows mikrofon hangerõ beállításával!


Állítsa be a mikrofon érzékenységét a ritmus jellegû gyakorlatokhoz. Ez a beállítás nem azonos a Windows mikrofon hangerõ beállításával!


Ha ezt bejelöli, a frekvencia analízist (hangmagasság értékelés) dupla érzékenységûre állítja. Ez jobban leterheli a processzort. Ha ezt nem jelöli be, az EarMaster nem fogja tudni megkülönböztetni a 110 Hz alatti hangokat.


Ha ezt bejelöli, az EarMaster minden válasza után hanggal megerõsíti, jól válaszolt-e?!


Válasszon egy hangfájlt (*.wav), melyet jó válasz esetén játszik le a program! A legördülõ menü megmutatja az összes *.wav fájlt, amely a \Media alkönyvtárban található.


Válasszon egy hangfájlt (*.wav), melyet rossz válasz esetén játszik le a program! A legördülõ menü megmutatja az összes *.wav fájlt, amely a \Media alkönyvtárban található.


Itt állíthatja be a Windows ’wave’ hangerõt, tudniillik a hangeffektek hangerejét.


Ha ezt bejelöli, megnyomhatja a gyakorlatot vezérlõ gombokat (pl. Új feladat, Feladat újrahallgatása stb.) a MIDI-hangszere segítségével (távvezérlés). Minden nyomógomb egy-egy billentyûhöz rendelhetõ.


Adjon meg egy hangot (billentyût) a funkció vezérléséhez! Amikor ezt a hangot leüti a MIDI-hangszerén, a hozzárendelt nyomógombot aktiválja a programban.


Ha ezt bejelöli, a nyújtó (damper) pedál megnyomása azonos jelentéssel fog bírni, mintha a billentyûzeten az <ENTER> vagy a <RETURN> billentyûket ütötte volna le. (nem zongorista MIDI-használóknak: a nyújtó pedál lenyomása a 64-es kontroller üzenetnek felel meg)


 Eredmények

Az ’Eredmények’ ablakban megnézheti és összehasonlíthatja az aktuálisan választott gyakorlatban elért eredményeket.

Az ablak felsõ sávjában lévõ gombokkal kiválaszthatja, mely elemeket akarja látni, vagy elrejteni:

•	A gyakorlat indításának dátuma és idõpontja

•	Idõtartam – az az idõhossz, ameddig a gyakorlatot végezte

•	Válaszadás ideje – az az idõ, amelyet gondolkodással töltött el (a feladat elhangzása és a válaszadás közt eltelt idõ)

•	Szint név – a gyakorlat fájl, vagy a Feladatsor-lépés (“Tanársegéd”) neve.

•	Részletek – különbözõ részeredmények az akkord és hangközgyakorlatokban.

Figyelem: az eredmények csak akkor kerülnek mentésre, ha legalább 5 kérdésre (feladatra) válaszolt. Mielõtt az eredményeket nullázza (visszaállítja alapra), mindig lehetõség van az eredmények mentésére, avagy ennek elhagyására.

Az ablak bal alsó felében látható a statisztikai összegzés idõszaka. Ezt megváltoztathatja a ’Mutat’ menü ’Eredmény összegzés’ almenüjében.

Az “Átlagos válaszidõ” az egyes feladatokra adott válaszok átlaga – így néhány másodpercnek elégnek kéne lenni…


 Gyakorlat megnyitása

Egy gyakorlat beállítás megnyitása (betöltése) lemezrõl.

A lista tartalmazza az összes *.EAR kiterjesztésû fájl nevét, mely az EarMaster mappában található.

Hálózatban ez a lista mutatja a közös könyvtárban és az egyéni mappában lévõ fájlokat egyaránt. Az utóbbiak ‘*’ – jelzéssel szerepelnek.

Minden fájl magában foglalja az összes gyakorlat beállításait.

Nyomja meg a ’Keresés’ gombot, ha a lemez más mappáiban, vagy másik lemezrõl szeretne fájlt megnyitni.


 Gyakorlat elmentése

A gyakorlat beállításainak elmentése fájlba, lemezre.

A kiinduló könyvtár a felhasználók egyéni könyvtára (ha ilyen meg lett jelölve), egyébként az EarMaster mappa.

Minden fájl magában foglalja az összes gyakorlat beállításait.


A felhasználó teljes neve. Ezt fogja használni az eredmények megtekintésekor vagy kinyomtatásakor.


Felhasználó. Az a név, amit az EarMaster indításakor bejelentkezésként kell használnia. Ha rendelkezik a Windowsban felhasználói névvel, akkor itt ugyanazt a nevet kell használnia!


Nem kötelezõ jelszót beírnia, ha nem akar külön védelmet beállításaihoz és eredményeihez.


Határozza meg a felhasználó hozzáférési szintjét:

A tanulók használhatják a gyakorlatokat és a ’Feladatsort (“Tanársegéd”)’-et.

A tanárok láthatják és kinyomtathatják az összes felhasználó eredményét. Õk új Feladatsort (“Tanársegéd”-et) is összeállíthatnak.

Az adminisztrátorok tartják karban a rendszerbeállításokat és az adatbázist.


Határozza meg, hogy a felhasználó választhat-e önmaga Feladatsort (’Tanársegéd’-et), illetve feladatsor lépést! Ha ezt nem jelöli be, csak a tanár választhatja meg, melyik feladatsorral dolgozzon a tanuló, és melyik lépéssel kezdje.


Határozza meg, hogy a felhasználó végezhet-e maga gyakorlat beállításokat, és elmentheti-e azt lemezre?!


Határozza meg, hogy a felhasználó bevihet-e a programba új akkordokat, illetve hangközöket?! Ez fontos kérdés, hiszen minden tanuló ugyanazt a felhasználói akkord/hangközkészletet használja. Ha egy felhasználó ebbõl kitöröl pl. egy akkordot, az a többiek számára sem lesz a továbbiakban elérhetõ.


Határozza meg, hogy a felhasználó megváltoztathatja-e a MIDI-, a szín- és a nyelvi beállításokat?! Az egyes felhasználó által létrehozott beállítások nem változtatják meg a többi felhasználóét.


Beosztja a tanulót valamelyik osztályba.


Törli a felhasználót az osztályból.


A felhasználó saját mappáját használja, mint kezdõ mappát, amikor megnyit és elment egy gyakorlat beállítást. Ha nincs mappa megjelölve, a program fõkönyvtára tölti be ezt a funkciót.


A közös mappát használja a program induló könyvtárként a gyakorlat beállítások és a feladatsorok betöltéséhez. Ha nincs meghatározva ilyen, a program fõkönyvtára látja el ezt a funkciót.


Nyomja meg ezt a gombot, hogy elmentse az aktuális MIDI-, nyelv- és ablakméret beállításokat, mint alapbeállítást. Ez a beállítás jelenik meg, ha új felhasználót ad a rendszerhez, vagy ha a felhasználó vendégként jelentkezik be.


Az EarMaster adatfájlok helye, mely tartalmazza a felhasználói profilokat és az eredményeket. Különbözõ komputerek használhatják ugyanazt az adatfájlt hálózatban. Ez a beállítás ezen a gépen helyileg fog tárolódni a regisztrációs bázisban. Ha az adatfájlok helyét megváltoztatja, akkor minden olyan gép beállításaiban ezt jelezni kell, mely ezeket a fájlokat használja!


A gép teljesítményének javítása, a hálózati forgalom csökkentése és lemezhely megtakarítás végett törölheti a korábbi eredményeket az adatbázisból. Az eredmények örökre törlõdnek, és nem visszaállíthatók! Ez elõtt a mûvelet elõtt célszerû az eredményekrõl biztonsági másolatot készíteni (valamennyi fájlról a \Data\Results\ mappából).


Ha ezt megjelöli, a felhasználók bejelentkezhetnek vendégként, szûkített jogosultságokkal.


Ha ezt megjelöli, a felhasználók maguk is hozzáadhatják magukat a listához, mint EarMaster felhasználók, de csak tanulói jogosultsággal.

Ha ezt nem jelöli be, akkor vendégeket és felhasználókat csak a tanár adhat hozzá az EarMaster-hez.


Ha ezt megjelöli, az EarMaster nem fogja a felhasználótól a felhasználói nevet kérdezni programindításkor, hanem azt a Windows bejelentkezés alapján érvényesíti.


    Osztálynapló

 (Csak a tanárok részére elérhetõ az EarMaster School-ban)

Az osztály lehetõséget ad arra, hogy a felhasználókat csoportosíthassa. Ez akkor lehet szükséges, ha csak a felhasználók egy csoportjának eredményeit szeretné megnézni vagy kinyomtatni. (Nem az összes felhasználóét)

Új osztály létrehozása:

Válassza az ’Osztálynapló’ menüpontot a ’Beállítások’ menüben! Nyomja meg az “Új” gombot! Adjon egy nevet az osztálynak, jelölje ki a tanárát, és végül egy feladatsort az osztálynak. Nyomja meg a “Hozzáad/elvesz” gombot, hogy hozzáadhasson egy tanulót az osztályhoz!

Figyelem: Egy osztály törlése nem fogja törölni az érintett felhasználókat a programból! Ez csak a felhasználók osztályhoz tartozását szünteti meg.

Az osztályokat használja a jelentés készítésekor, és a Felhasználók áttekintése funkcióban.


Felhasználók adatainak importja/exportja

A ’File’ menü ’Felhasználók adatainak importja/exportja’ funkciójával (almenüjével) lehetõség van a felhasználók egyéni eredményeinek és feladatainak lemezre írására, illetve lemezrõl beolvasására. Ezzel lehetõvé válik az eredmények küldése és fogadása másik gépre illetve géprõl, pl. ha a tanár látni akarja a diákok otthoni munkájának eredményét.

Egy tipikus lehetõség, amikor az iskolában telepítve van az EarMaster School 4, és a diákok is rendelkeznek az EarMaster 4 valamelyik verziójával otthon:

1. A tanár készít egy feladatsort egyéni beállításokkal, és azt elhelyezi egy ’Feladatsor (“Tanársegéd”)’ fájlban. (csak az    EarMaster School-ban lehetséges)

2. A feladatsort hozzárendelheti egy osztályhoz vagy egy felhasználóhoz. (csak az    EarMaster School-ban lehetséges)

3. Minden diák floppy-ra menti ezt a fájlt (ezeket a beállításokat), mielõtt hazamenne az iskolából.

4. A  tanuló - hazaérve - a floppy-lemezrõl a saját programjába beolvassa ezt a fájlt.

5. Amikor a tanuló végzett a feladatsorral, eredményeit szintén floppy-ra menti, és azt beviszi az iskolába.

6. A tanár a lemezrõl beolvasva megnézheti, kinyomtathatja összehasonlíthatja az osztály tanulóinak eredményeit. (csak az    EarMaster School-ban lehetséges)


A célkönyvtár (mappa), ahova a felhasználó adatait (eredményeit) kimentjük.


A felhasználó, akinek az adatait kimentjük.


A forráskönyvtár, ahol a felhasználó adatai (eredményei) találhatók.


A felhasználó, akinek az adatait és beállításait felülírjuk a beolvasott adatokkal.


Az összes ’tanuló’ státuszú felhasználó eredményének megtekintése és nyomtatása.


Az összes felhasználó eredményének megtekintése és nyomtatása.


Az adott osztályhoz tartozó tanulók eredményeinek megtekintése és nyomtatása.


Az adott gyakorlatban elért összes eredmény megtekintése és nyomtatása.


Az elõzõ napok eredményeinek megtekintése és nyomtatása. Írjon be egy számot!


Adott felhasználó eredményeinek megtekintése és nyomtatása.


Feladatsor (“Tanársegéd”)

Az EarMaster Feladatsor (“Tanársegéd”) segítségével a tanuló végighaladhat egy tanár által összeállított gyakorlatsorozaton. Az EarMaster nyomon követi az eredményeit, és a további gyakorlatok nehézségét ennek megfelelõen szabályozza.

Egy feladatsor elindításához válassza ki a ’Fájl’ menübõl a ’Feladatsor (“Tanársegéd”)’ menüpontot. (vagy aktiválja az eszközsor megfelelõ gombját)

Ha megfelelõ számú gyakorlatot elvégzett, a “Tanársegéd” értékeli az eredményeit, és annak megfelelõen

1. tovább engedi a következõ lépésre, vagy

2. megismételteti az adott lépést, esetleg

3. visszaküldi az elõzõ lépéshez.

Ön szabadon mozoghat az EarMaster 10 féle gyakorlatában, és onnan visszatérhet a Feladatsorhoz (“Tanársegédhez”), amit ott folytathat, ahol elõzõleg abbahagyta.

A Feladatsorból bármikor kiléphet, ha ismét rákattint a ’Fájl’ menü ’Feladatsor (“Tanársegéd”) menüpontra.

Figyelem: A Gyakorlat beállítások nem elérhetõk addig, amíg a Feladatsorral dolgozik. Feladatsort átszerkeszteni, vagy újat készíteni a “Feladatsor szerkesztõ’-ben lehet. Ez csak az “EarMaster School”-ban megtalálható, és csak a tanár vagy adminisztrátor státuszú felhasználók kapnak jogosultságot a használatához.

Kapcsolódó témakörök:

Hangközviszonyítás

Hangköz felismerés

Akkord felismerés

Akkordfordítás felismerésAkkordfûzés

Skála felismerés

Ritmus olvasás

Ritmus visszaadás

Ritmus javítás

Dallamdiktálás


Feladatsor (“Tanársegéd”) szerkesztõ

 (Ez csak az EarMaster School-ban elérhetõ)

Ezzel a funkcióval komplett hallásfejlesztõ gyakorlatsorozatot lehet összeállítani, amit késõbb bárki bármikor használhat. Ez könnyen átvihetõ másik komputerre is.

Egy Feladatsor (“Tanársegéd”) a gyakorlat beállítások egy aktuális készlete. A Feladatsor összeállításához egyszerûen egy listát kell készíteni a gyakorlat beállításokról, és nevet kell adni minden lépésnek. Ezután készíteni kell a lépésekhez egy rövid tájékoztatót, majd definiálni, a tanuló milyen teljesítmény esetén haladhat tovább a lista következõ lépésére.

A Feladatsor szerkesztõ listában az aktuális gyakorlat összes definiált lépése megtalálható. Minden gyakorlatfajtához külön lépés-sorozat tartozik.

Lépés (feladat) hozzáadása:

Ha jobb egérgombbal kattint a Feladatsor szerkesztõ listájában, hozzáadhat új lépést, törölheti az aktuális lépést, vagy szerkesztheti azt. További segítséget a kapcsolódó ablakban talál.

Könnyen ellenõrizheti az adott lépések folyamatát: Kattintson minden lépésre, és nézze meg az adott lépéshez tartozó beállításokat a ’Gyakorlat beállítások’ ablakban.

Lépés szerkesztése:

A tájékoztató szöveg és a továbblépéshez szükséges százalék megváltoztatásához kattintson jobb egérgombbal az adott lépésre, és a megjelenõ ’Tulajdonságok’ menüben elvégezheti a változtatásokat, vagy kattintson duplán bal egérgombbal a lépésen, és az elõbbihez hasonlóan folytassa.

Az adott lépéshez tartozó gyakorlat beállításokat is szerkesztheti: kattintson egyet bal egérgombbal a lista megfelelõ lépésére, hogy a Gyakorlat beállítások ablak átvehesse ennek a lépésnek a beállításait. Ha itt elvégezte a szükséges módosításokat, a listában jobb egérgombbal kattint az adott lépésre, és az így megjelenõ menük közül a ’Frissítés a “Beállítás” ablakból’ menüre kattint. Így a lépésbe átíródnak a megfelelõ beállítások.

Feladatsor behelyezése:

Ha egy másik Feladatsor lépéseit szeretné beilleszteni, keresse meg a ’Fájl’ menüben a ’Feladatsor behelyezése’ almenüt. Erre kattintva a kiválasztott feladatsor minden lépése hozzáadódik az aktuálisan szerkesztett feladatsor végéhez. Ilyen módon a kiválasztott feladatsorból csak az adott gyakorlat lépései adódnak a listához, a feladatsor többi gyakorlatának listája nem fog változni! Ha hozzáadta a kívánt lépéseket a lista végéhez, utána egérhúzással arra a helyre viheti, ahová a listán belül illeszteni szeretné az illetõ lépéseket.

A felhasználó által definiált akkordok:

Ha új akkordokat szerkeszt, miközben a Feladatsor szerkesztõ módban van, akkor ezek a harmóniák csak ebben a feladatsorban fognak megjelenni. Betölteni és menteni is csak ezzel a feladatsorral lehet. Ha kilép a Feladatsor szerkesztõ módból, az EarMaster azoknak az akkordoknak a beállításait tölti be, melyeket a Feladatsor szerkesztõ módba belépés elõtt definiált.

Ez azt jelenti, hogy módjában áll olyan új akkordokat szerkeszteni, melyek csak a Feladatsorban fognak megjelenni, de a program normál felhasználói akkordjai között nem!


Adjon a Feladatsornak egy leíró nevet.


Itt adhat egy általános leírást a gyakorlatsorról. Ez a leírás akkor látható, amikor a felhasználó betölti a Feladatsort (“Tanársegéd”). A leírás maximálisan 255 karakter hosszú lehet.


Itt adhatja meg a Feladatsor szerzõjének nevét.


Feladatsor (“Tanársegéd”) betöltése

Válasszon egy Feladatsort, amellyel dolgozni szeretne! A “Részletek” gombra kattintva megnézheti a Feladatsor szerzõjét, és a szerzõ leírását a Feladatsorról.


Adjon a lépésnek egy leíró jellegû címet, amely tájékoztatja a felhasználót, mit fog gyakorolni.


Jelölje meg, a válaszok hány százalékának kell jónak lenni ahhoz, hogy a felhasználó tovább mehessen a Feladatsor következõ lépésére.


Válasszon egy alsó határt, amely még elfogadható eredmény. Ha ennél az eredménynél gyengébben teljesít a felhasználó, a program vissza fogja irányítani az elõzõ lépéshez.


Tájékoztató a tanulónak errõl a lépésrõl, és arról, hogyan kell dolgozni vele. A leírás maximális hossza 255 karakter lehet.


A gyakorlat beállítások az EarMaster fõablakából másolódnak át. Ez hasznos lehet akkor, ha egy olyan új lépést szeretne létrehozni, amely az elõzõ lépés beállításain alapul kisebb változtatással.


A gyakorlat beállítások a megadott fájlból másolódnak. Bár egy gyakorlat beállító fájl (*.ear) az összes gyakorlat beállításait tartalmazza, ez esetben csak az adott gyakorlat vonatkozó adatai másolódnak.


Válassza ki, hogy az új lépés a kiválasztott lépés elé vagy után kerüljön a gyakorlat listában.


A lépésben szereplõ feladatok száma. Ha a felhasználó megoldotta az adott számú feladatot, az eredmény elmentésre kerül, és az EarMaster a megadott vissza- illetve elõrelépési szinttõl függõen ajánlja meg a következõ lépést.


A gyakorlat beállítások átmásolásra kerülnek a választott lépésbõl. Ezt késõbb módosítani lehet: válasszon egy lépést, végezze el a módosításokat az EarMaster fõablakban, kattintson jobb egérgombbal a listában az adott lépésre, és válassza a ’Frissítés a “Beállítás” ablakból’ menüpontot.


Felhasználók áttekintése

A ’Felhasználók áttekintése’ ablakban látható az összes felhasználó vagy azok egy csoportja, és eredményeiknek illetve beállításaiknak összegzése.

Az eredményösszegzés az adott gyakorlatra vonatkozik. Az összegzés idõperiódusát megváltoztathatja a ’Mutat’ menü ’Eredmény összegzés’ menüpontjában. A felhasználók eredményeinek frissítéséhez és újraszámlálásához használja a ’Mutat’ menü ’Frissítés’ menüpontját.

Jobb egérgombbal kattintva a felhasználó nevén, az elõugró menüsorban hozzáadhat és eltávolíthat felhasználót, valamint beállíthatja annak jellemzõit.

Ezt megteheti a menüsorban lévõ ’Mutat’ menü ’Felhasználók’ menüpontjából is, ahol ráadásul a felhasználók különbözõ csoportjait is megnézheti.

A felhasználók osztályok  szerint lesznek csoportosítva.

Ha egy-egy felhasználó eredményeinek részleteit szeretné megnézni az adott gyakorlatra vonatkozóan, kattintson az Eszközsorban az ’Eredmények’ gombra!

Ha megnézni és kinyomtatni is szeretné a felhasználó eredményeit, a ’Fájl’ menü ’Nyomtatás’ párbeszédablakában válassza ki az adott felhasználót, és nyomja meg a ’Nyomtatási kép’ gombot.


Válassza ki a Feladatsort (“Tanársegéd”), amellyel a felhasználónak dolgoznia kell!


A feladatsort törli az adott felhasználó munkái közül. Ha a felhasználónak nem volt jogosultsága a Feladatsor megváltoztatásához, akkor ezután addig nem használhat a felhasználó Feladatsort, amíg a tanár nem választ neki egyet a ’Feladatsor betöltés’ funkcióval.


Válassza ki a kezdõ lépést az egyes gyakorlatokhoz.


  Indulás az EarMaster-rel

Az EarMaster 10 féle hallásfejlesztõ területet kínál fel. Ezek listája a menüsor ’Gyakorlatok’ menüjében található. Minden gyakorlathoz további ablakok tartoznak, melyeket az egyes gyakorlatokhoz tartozó almenükben talál meg.

A ’Gyakorlat’ ablak az, ahol a tényleges munkát végzi.

A ’Gyakorlat beállítások’ ablakban megteheti saját beállításait az adott gyakorlathoz. Ezeket a beállításokat elmentheti saját .ear fájlba.

Az ’Eredmények’ ablakban megnézheti és összevetheti jelenlegi eredményeit a korábbiakkal.

A ’Felhasználók áttekintése’ ablakban (amely csak a tanárok számára látható a School verzióban), összegzést láthat az egyes felhasználók elért eredményeirõl.

Kapcsolódó témakörök az egyes gyakorlatokról:

Hangközviszonyítás

Hangköz felismerés

Akkord felismerés

Akkordfordítás felismerés

Akkordfûzés

Skála felismerés

Ritmus olvasás

Ritmus visszaadás

Ritmus javítás

Dallamdiktálás


 Gyorsbillentyû parancsok az EarMaster-ben

Néhány funkciót az EarMaster-ben vezérelhetünk a számítógép billentyûzetérõl. Ezt az ismertetõt kinyomtathatja, hogy a billentyûsor mellett tudja tartani:

Ctrl + 1 	Hangközviszonyítás

Ctrl + 2 	Hangköz felismerés

Ctrl + 3 	Akkord felismerés

Ctrl + 4 	Akkordfordítás felismerés

Ctrl + 5 	Akkordfûzés

Ctrl + 6 	Skála felismerés

Ctrl + 7 	Ritmus olvasás

Ctrl + 8 	Ritmus visszaadás

Ctrl + 9 	Ritmus javítás

Ctrl + 0 	Dallamdiktálás

Shift + 1 	Gyakorlat

Shift + 2 	Gyakorlat beállítások

Shift + 3 	Eredmények

Shift + 4 	Felhasználók áttekintése (Csak a tanároknak az EarMaster School-ban)

F1 	Súgó

Ctrl + F1 	Környezetfüggõ Súgó

F2 	Gyakolat beállítások betöltése

F3 	Gyakorlat beállítások mentése

F4 	Feladatsor (“Tanársegéd”)

Shift + F4 	Feladatsor szerkesztõ (Csak a tanároknak az EarMaster School-ban)

F5 	Új feladat

F6 	Feladat újrahallgatása

F7-F8 	Gyakorlatfüggõ parancsok

F9 	Állj!

Shift + F9 	MIDI hangnémítás

Ctrl + F9 	MIDI kontrollerek “reset”

Ctrl + F12 	MIDI távvezérlés

Ctrl + M 	Metronóm hang

F10 	Eredmények nyomtatása

F11 	Osztálynapló (Csak a tanároknak az EarMaster School-ban)

Shift + F2 	Új feladat automatikusan

Shift + F5 	Válasz kottán

Shift + F6 	Válasz név szerint

Shift + F7 	Válasz zongorán

Shift + F8 	Válasz gitáron

Shift + F11 	Válasz mikrofonnal

Shift + F12 	Válasz MIDI bemenetrõl

A kottasorban keresztet és bé-t adhat a hangokhoz lenyomott bal egérgomb mellett:

z 	bb (dupla bé)

x	b (bé)

c 	(természetes hang)

v 	# (kereszt)

b 	x (dupla kereszt)

Ctrl + Delete	Az aktuális gyakorlat újraindítása


 A mikrofon használata

Az EarMaster egy továbbfejlesztett Wave-to-MIDI (Wave-rõl MIDI-re) technológiát alkalmaz, mellyel a mikrofonról érkezõ jelet analizálja.

Hangmagasság érzékelés

A Wave-to-MIDI átalakító megfigyeli az Ön énekét, és felismeri, milyen hangot énekelt, játszott. A felismerés pontosságát azonban nagyban befolyásolja a hang – az énekhang vagy hangszerhang – felharmonikus tartománya. Néha elõfordul, hogy valamelyik felhang erõsebb az alaphangnál, ilyenkor az EarMaster azt ismeri fel alaphangként.

A mikrofonos azonosításhoz legalább Pentium processzor szükséges. Ha nem áll rendelkezésére elegendõ processzor teljesítmény, az eredmény nem lesz megbízható.

Ritmus érzékelés

A Ritmus olvasásban és Ritmus visszaadásban a ritmust kétféle módon is megszólaltathatja: tapsolással, vagy dobolással.

A háttérzaj, a mikrofon érzékenysége és a hangkártya erõsítése típusonként eltérõ, ezért a ritmus bemenet érzékenységét a Program beállításokban optimalizálnia kell saját rendszeréhez.

A mikrofon beállítása a Windows mixerben

A Windows keverõpultban a mikrofont ki kell választani felvételi egységnek. Nyissa meg a keverõpultot úgy, hogy duplán kattint a Windows ablak jobb alsó sarkában a Futó programokban (Task bar) a Hangszóró ikonra. Váltson felvételi módra a ’Beállítások’ menü ’Tulajdonságok’ menüpontjában, a ’Hangerõ beállítása: Felvétel’ kiválasztásával. A Mikrofont jelölje ki a hangerõszabályzó listából az eszközök közül (az elõtte lévõ négyzetre kattintva). Ezután nyomja meg az OK gombot. A Hangerõ panelen jelölje ki a mikrofont beviteli eszköznek, ha nem volna kijelölve (a “Kijelölés” négyzetre kattintással)!


 Hangközelmélet

A hangközgyakorlat a hallásfejlesztés legalapvetõbb része. Minden harmónia és dallam felfogható hangközök sorozataként is. Kezdõként ezért a gyakorlást a hangközökkel kell indítania, és késõbb folytathatja pl. a dallamdiktálással, hogy hangközök sorozatát is fel tudja ismerni, vagy akkord felismeréssel, hogy azonosítani tudjon több mint két, egyszerre hangzó hangot is.

A hangköz nem más, mint két hang magasságának különbsége. A hangközt számszerû értéke és jellege alapján jelöljük. A számérték azonos a diatonikus skála szerint a hangközbe bennfoglalt hangok számával.

A jelleg lehet tiszta(t), nagy(n), kis(k), szûkített(sz) vagy bõvített(b).

A prím(1), kvart(4), kvint(5)és oktáv(8) tiszta hangközök. Mindegyikük lehet szûkített (egy kromatikus hanggal – b1 - kisebb) vagy bõvített (egy kromatikus hanggal – b1 - nagyobb) is.

A többi hangköz egy oktávon belül: a szekund(2), a terc(3), a szext(6) és a szeptim(7). Ezek kicsik vagy nagyok lehetnek.

Alább példát láthatunk egy-egy tiszta, szûkített és bõvített kvintre, valamint nagy és kis tercre.

Az EarMaster-ben meghallgathatja a hangközöket, ha a Hangköz felismerés gyakorlatban a hangközök nevére kattint. Figyeljen rá, hogy ehhez a “Név szerint” funkció kijelölt legyen a ’Válasz módja’ menüben!

Úgy is meghallgathatja a hangközöket, ha a Gyakorlat beállítások ablakban jobb egérgombbal kattint rájuk.

A hangközök felismerése

Két szokásos módja van a hangköz felismerésének:

1. Használjon jól ismert dalokat! Keressen minden hangközhöz olyan ismert dalt, amelyik a hangközök valamelyikével kezdõdik! Amikor meghallja a hangközt, eszébe fog jutni az adott dallam, és róla a hangköz. Nézze meg dallam példáinkat!

Ezt a módszert - mindazonáltal - kritikával szokták illetni, mert az nem veszi figyelembe a hangközök hangnemben betöltött szerepét. Pl. a C – F tiszta kvartnak más a funkciója C-dúrban, mint F-dúrban, így ez a módszer nehézséget okozhat blattolásnál.

2. Énekeljen fel- és lefelé egy skálát, kiénekelve abból a megfelelõ hangközöket! Ez a módszer szorosan kapcsolódik a szolmizációs rendszerhez (amely szótagokat használ a hangok megnevezéséhez: dó, ré, mi, fá, szó, lá, tí, dó), és amit gyakran használnak a jó kottaolvasás tanulásához. Az EarMaster mutatja a szolmizációs hangokat zárójelben a hangok abszolút neve után, amikor hangot visz be Hangköz felismerés és Dallamdiktálás esetén.

Kapcsolódó gyakorlatok az Earmaster-ben:

Hangközviszonyítás

Hangköz felismerés


   Dallampéldák a hangköz felismeréshez.

Ezeket a dalokat jól használhatja a hangközök felismeréséhez:

k2	Isn't she lovely (Stevie Wonder)

n2 	Süss fel nap, Happy birthday

k3  	Zsipp-zsupp, Georgia on my mind

n3  	Boci-boci tarka, Morning has broken

t4  	Ettem szõlõt, Love me tender

Tritonusz (b4)	Maria (West side story)

t5 	Kis kece lányom

k6  	Gerencséri utca,  When Israel Was In Egypt’s Land

n6	A part alatt

k7  	Somewhere (West side story)

n7 	Bali Hai (South Pacific) 3.hang

t8 	Hej Vargáné 5.hang, Somewhere over the Rainbow


 Skála elmélet (Skálák és modálisok)

A “Scale” szó létrát jelent a latinban. A skála a tonális alapja a zenének, tulajdonképpen a hangok egy olyan készlete, amelybõl a dallamokat és harmóniákat felépítjük. A skálában a hangokat magasságuk szerint sorba rendezve találjuk. Ez a tonális alap variálódik a különbözõ korokban és országokban, így jön létre a sokféle skála.

A dúr hangsor, a moll hangsor és az egyházi modálisok mind a diatonikus hangsoron alapulnak. Ugyanazokat a hangokat tartalmazzák, de az alaphangjuk (központi hangjuk) más. A C-dúr skála így néz ki:

Az dór hangsorban ugyanezek a hangok szerepelnek, de az alaphangja D:

Hasonlóképpen a(z egyházi) fríg hangsor alaphangja az E-hang, a líd hangsoré F, a mixolídé G, a természetes mollé (eol) Á és a lokriszié H. (A magyar zeneelméletben a modális hangsorok alaphangjai: dór – ré, fríg – mí, líd – fá, mixolíd – szó, eol – lá, lokriszi – tí)

Skála felismerés

Egy skála kis hangközök (lépések) sorozata – egész hangoké és félhangoké. A hangsorok felismeréséhez ismerni kell ezeknek a hangközöknek az adott skálában érvényes sorozatát (a hangsor felépítését).

A diatonikus hangsoron alapuló skálák mindig 5 egész és 2 félhangot tartalmaznak. A legkönnyebb úgy azonosítani a skálákat, hogy a két félhang helyét figyeljük meg!

Az EarMaster-ben meghallgathatja a hangsorokat, ha a Skála felismerés gyakorlatban a skálák nevére kattint. Figyeljen rá, hogy ehhez a “Név szerint” funkció kijelölt legyen a ’Válasz módja’ menüben!

Úgy is meghallgathatja a skálákat, ha a Gyakorlat beállítások ablakban jobb egérgombbal kattint rájuk.

Kapcsolódó témakörök az Earmaster-ben:

Skála felismerés


 Akkordelmélet

Az akkord egyszerre megszólaló 3 vagy több hang – rendszerint egymásra épülõ tercekbõl áll. A harmóniákat alaphangjuk, jellegük (dúr, moll, bõvített, szeptim stb.) és fordításuk határozzák meg.

Hármashangzatok

Három hangból álló hangzat, mely alaphangból és a ráépülõ tercbõl illetve kvintbõl áll.

Dúr – nagy terce és tiszta kvintje van (az alaphang felett)

Moll – kis terce és tiszta kvintje van

Szûkített – kis terce és szûkített kvintje van

Bõvített – nagy terce és bõvített kvintje van

Az elsõ kettõt konszonáns, a második kettõt disszonáns harmóniának tartjuk.

Alább a C-dúr, C-moll, C-szûkített és a C-bõvített akkordokat láthatjuk:

A szeptim akkordok (négyeshangzatok)

Ezekben a hármashangzat fölé még egy terc épül.

(Domináns) 7 – dúr hármas, alapra épülõ kis szeptimmel. (szó-ti-ré-fá)

Moll 7 – moll hármas, alapra épülõ kis szeptimmel. (lá,-dó-mi-szó)

Szûkített 7 – szûkített hármas, alapra épülõ szûk szeptimmel. (szi-ti-ré-fá)

Félszûkített – szûkített hármas, alapra épülõ kis szeptimmel. (ti-ré-fá-lá)

A fent említetteken kívül még sok fajta hármashangzat + szeptim kombináció létezik. Ezek megtalálhatók az Akkord felismerés gyakorlat ’Gyakorlat beállítások’ ablakában.

Fordítások

Az akkordnak azt a helyzetét, amikor az alaphang alul helyezkedik el, alaphelyzetnek hívjuk. Amikor a harmónia terce (pl. C-dúrban az E-hang) van alul, elsõ fordításnak hívjuk, amikor a kvinthang kerül alulra (pl. C-dúr esetében a G-hang), második fordításról beszélünk.

Alább a C-dúr akkord látható alaphelyzetben és 1. valamint 2. fordításban:

Akkordfûzés

Akkordfûzésrõl akkor beszélünk, amikor több akkordot játsszunk el, sorba egymás után. Ha akkordfûzést kell felismernünk, a fõ feladat az, hogy megtaláljuk (meghalljuk) a harmóniák funkcióit a hangnemen belül, és viszonyítani tudjuk azt a tonikához (alaphoz), amelyet az akkordfûzés elõtt hallunk megszólalni. A harmóniák alaphoz viszonyított fokszámát római számokkal - I, II, III, IV, stb. - jelöljük, mely mutatja a harmónia alaphangjának helyét a hangsorban.

A dúr- és a moll-hangsor mind a hét foka lehet egy harmónia alaphangja. Az I, IV és V. fokú hármashangzatok alapvetõen fontosak egy mû tonalitásának megérzésében. (Fõhármasok)

Alább láthatók a C-dúr skála hét hangjára építhetõ hármashangzatok:

I (C-dúr), II (d-moll), III (e-moll), IV (F-dúr), V (G-dúr), VI (a-moll), VII (h-szûkített)

Moll hangnemekben az EarMaster mindig úgy jelzi a harmadik, hatodik és hetedik fokot, hogy bIII, bVI and bVII, a tévedés elkerülése végett. Pl. a III. fok dúrban az alaphang feletti nagy terc, míg mollban az alaphang feletti kis terc. Ezt jelezzük a moll esetében bIII-ként. (A magyar zeneelmélet ezt a jelölést így nem alkalmazza)

Az akkordfûzés felismeréséhez nagy segítség a basszus menetének megfigyelése, mely sok esetben az akkordok alaphangja. Figyeljen rá, hogy az akkordfûzésben ugyanaz az alaphangmozgás más jellegû harmóniákkal is járhat! Az alaphangok az EarMaster-ben ki is kapcsolhatók, ha nehezíteni akarjuk az akkordfûzés felismerését.

Kapcsolódó témakörök az Earmaster-ben:

Akkord felismerés

Akkordfordítás felismerés

Akkordfûzés


A diatonikus hangsor az a természetes skála, amely az oktávot öt egész és két félhangra osztja. A zongora fehér billentyûi ezt a hangsort adják ki. (Míg a feketék a pentatont – a fordító megj.) Minden hangnemben van egy hasonlóan felépülõ skála. Például a dúr skála diatonikus hangsor.